Erxian Temple in Nanshentou, main hall 南神頭二仙廟正殿
edition published: 2018-03-21-04:00
language: en; zh-latn-pinyin; zh-Hant; zh-Hans; zh-latn-wadegile
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

main hall; 正殿; 正殿; zhèngdiàn; cheng-tien; Nanshentou Erxianmiao zhengdian; 南神頭二仙廟正殿; 南神头二仙庙正殿; Erxianmiao
identifier: https://architecturasinica.org/place/000216
Date: 1125-1234
Dynasty: Jin 1115 - 1234
location: 35.69555 113.35965
location: [35˚ 41.733' 113˚ 21.579']
Type: palatial hall, dian, 殿, 殿
12