Erxian Temple in Xixi 西溪二仙廟
edition published: 2018-03-21-04:00
language: en; zh-latn-pinyin; zh-Hant; zh-Hans; zh-latn-wadegile
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

Erxian Temple in Xixi; Xīxī Èrxiānmiào; Hsi-hsi Er-hsien-miao; 西溪二仙廟; 西溪二仙庙
identifier: https://architecturasinica.org/place/000104
Dynasty: Jin 1115 - 1234
Wikipedia (in Chinese)
百度百科
location: 山西省陵川县, Shanxi, China, Shanxi 山西省 山西省, Lingchuan 陵川, 县 County
location: 35.7605 113.2553333
Type: temple, miao, 廟, 庙
12