Baiyu Palace, Hall of the Three Transcendents 白玉宮三仙殿
edition published: 2018-03-21-04:00
language: en; zh-latn-pinyin; zh-Hant; zh-Hans; zh-latn-wadegile
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

Hall of the Three Transcendents; 三仙殿; 三仙殿; Sānxiāndiàn; San-hsien-tien; Baiyugong Sanxiandian; 白玉宫三仙殿; 白玉宫三仙殿; Sanxiandian
identifier: https://architecturasinica.org/place/000130
Date: 1368-1911
Dynasty: Ming 1368 - 1644
The Hall of the Three Transcendents (三仙殿) in Baiyu Palace is located on the central axis of the complex and dates to the Ming-Qing dynasties. It has an overhanging gable roof, its front façade measures 8.56 m (28' 1") and its side facade measures 7.9 m (25' 11").
Type: palatial hall, dian, 殿, 殿
12